<template>
  <div class="allocateBillEdit-wrap">
    <!-- <a-spin :spinning="spinning" tip="Loading..."> -->
    <div class="ant-spin-nested-loading">
      <a-page-header :ghost="false" :backIcon="false" class="allocateBillEdit-back" >
        <!-- 自定义的二级文字标题 -->
        <template slot="subTitle">
          <a id="allocateBillEdit-back-btn" href="javascript:;" @click="handleBack"><a-icon type="left" /> 返回列表</a>
        </template>
        <!-- 操作区，位于 title 行的行尾 -->
        <template slot="extra" v-if="basicInfoData&&basicInfoData.printState!='UNABLE_PRINT'">
          <a-button
            key="3"
            type="primary"
            class="button-info"
            v-if="$hasPermissions('B_transferOut_detail_export')"
            id="allocateBillEdit-export-btn"
            :disabled="localDataSource.length==0"
            @click="handleExcel">导出Excel</a-button>
          <a-divider type="vertical" />
          <a-button
            key="2"
            type="primary"
            class="button-info"
            v-if="$hasPermissions('B_transferOut_print')"
            id="allocateBillEdit-db-print-btn"
            :disabled="localDataSource.length==0"
            @click="handlePrint('dbPrint')">调拨打印</a-button>
          <a-button
            key="1"
            type="default"
            class="button-info"
            v-if="$hasPermissions('B_transferOut_print')"
            id="allocateBillEdit-dbfl-print-btn"
            :disabled="localDataSource.length==0"
            @click="handlePrint('dbflPrint')">调拨分类打印</a-button>
        </template>
      </a-page-header>
      <a-card size="small" :bordered="false" v-if="basicInfoData" class="allocateBillEdit-cont">
        <a-collapse :activeKey="['0']">
          <a-collapse-panel key="0" header="基础信息">
            <a-descriptions :column="3">
              <a-descriptions-item label="调往对象">{{ (basicInfoData&&basicInfoData.targetName) || '--' }}</a-descriptions-item>
              <a-descriptions-item label="发货编号">{{ (basicInfoData&&basicInfoData.sendNo) || '--' }}</a-descriptions-item>
              <a-descriptions-item label="收货客户名称">{{ (basicInfoData&&basicInfoData.receiverName) || '--' }}</a-descriptions-item>
              <a-descriptions-item label="调拨单号">{{ (basicInfoData&&basicInfoData.allocateNo) || '--' }}</a-descriptions-item>
              <a-descriptions-item label="调拨类型">
                <AllocateType id="allocateEdit-allocateTypeSn" style="width: 200px;" @change="changeAllocateType" v-model="basicInfoData.allocateTypeSn"></AllocateType>
              </a-descriptions-item>
              <a-descriptions-item label="业务状态">{{ (basicInfoData&&basicInfoData.stateDictValue) || '--' }}</a-descriptions-item>
              <a-descriptions-item label="打印状态">{{ (basicInfoData&&basicInfoData.printStateDictValue) || '--' }}</a-descriptions-item>
              <a-descriptions-item label="起止时间">
                <span v-if="basicInfoData&&(basicInfoData.promoStartDate || basicInfoData.promoEndDate)">{{ (basicInfoData&&basicInfoData.promoStartDate) || '--' }} ~ {{ (basicInfoData&&basicInfoData.promoEndDate) || '--' }}</span>
                <span v-else>--</span>
              </a-descriptions-item>
              <a-descriptions-item label="备注">{{ (basicInfoData&&basicInfoData.remark) || '--' }}</a-descriptions-item>
            </a-descriptions>
          </a-collapse-panel>
        </a-collapse>
      </a-card>
      <!-- 选择产品 -->
      <a-card size="small" :bordered="false" class="allocateBillEdit-cont">
        <a-collapse :activeKey="['1']">
          <a-collapse-panel key="1" :forceRender="true" header="选择产品">
            <!-- 筛选条件 -->
            <div class="table-page-search-wrapper">
              <a-form layout="inline" @keyup.enter.native="$refs.table.refresh(true)">
                <a-row :gutter="15">
                  <a-col :md="6" :sm="24">
                    <a-form-item label="产品编码" prop="productCode">
                      <a-input id="allocateBillEdit-productCode" v-model.trim="queryParam.productCode" placeholder="请输入产品编码" allowClear />
                    </a-form-item>
                  </a-col>
                  <a-col :md="6" :sm="24">
                    <a-form-item label="产品名称" prop="productName">
                      <a-input id="allocateBillEdit-productName" v-model.trim="queryParam.productName" placeholder="请输入产品名称" allowClear />
                    </a-form-item>
                  </a-col>
                  <a-col :md="6" :sm="24">
                    <a-form-item label="原厂编码" prop="productOrigCode">
                      <a-input id="allocateBillEdit-productOrigCode" v-model.trim="queryParam.productOrigCode" placeholder="请输入原厂编码" allowClear />
                    </a-form-item>
                  </a-col>
                  <a-col :md="6" :sm="24" style="margin-bottom: 10px;">
                    <a-button type="primary" @click="$refs.table.refresh(true)" :disabled="disabled" id="storeTransferOutList-refresh">查询</a-button>
                    <a-button style="margin-left: 8px" @click="resetSearchForm" :disabled="disabled" id="storeTransferOutList-reset">重置</a-button>
                  </a-col>
                </a-row>
              </a-form>
            </div>
            <!-- 列表 -->
            <s-table
              class="sTable"
              ref="table"
              size="small"
              index="0"
              tableId="table1"
              :rowKey="(record) => record.stockSn"
              :columns="columns"
              :customRow="handleClickRow"
              :data="loadData"
              :scroll="{ y: 300 }"
              :defaultLoadData="false"
              bordered>
              <!-- 操作 -->
              <template slot="action1" slot-scope="text, record">
                <a-button size="small" type="link" class="button-primary" @click="handleAdd(record)" id="allocateBillEdit-add-btn">添加</a-button>
              </template>
            </s-table>
          </a-collapse-panel>
        </a-collapse>
      </a-card>
      <!-- 已选产品 -->
      <a-card size="small" :bordered="false" class="allocateBillEdit-cont">
        <a-collapse :activeKey="['2']">
          <a-collapse-panel key="2" :forceRender="true" header="已选产品">
            <!-- 总计 -->
            <a-alert type="info" style="margin-bottom:10px">
              <div slot="message">
                总数量：<strong>{{ (productTotal&&(productTotal.totalQty || productTotal.totalQty==0)) ? productTotal.totalQty : '--' }}</strong> ，
                <span v-if="$hasPermissions('B_isShowCost')">总成本（￥）：<strong>{{ (productTotal&&(productTotal.totalCost || productTotal.totalCost==0)) ? productTotal.totalCost : '--' }}</strong> ，</span>
                <span v-if="$hasPermissions('B_isShowPrice')">总售价（￥）：<strong>{{ (productTotal&&(productTotal.totalPrice || productTotal.totalPrice==0)) ? productTotal.totalPrice : '--' }}</strong></span>
              </div>
            </a-alert>
            <!-- 筛选条件 -->
            <a-row :gutter="15">
              <a-col :span="17">
                <div class="table-page-search-wrapper">
                  <a-form layout="inline" @keyup.enter.native="$refs.chooseTable.refresh(true)">
                    <a-row :gutter="15">
                      <a-col :md="9" :sm="24">
                        <a-form-item label="产品编码" prop="productCode">
                          <a-input id="allocateBillEdit-productCode" v-model.trim="chooseQueryParam.productCode" placeholder="请输入产品编码" allowClear />
                        </a-form-item>
                      </a-col>
                      <a-col :md="9" :sm="24">
                        <a-form-item label="产品名称" prop="productName">
                          <a-input id="allocateBillEdit-productName" v-model.trim="chooseQueryParam.productName" placeholder="请输入产品名称" allowClear />
                        </a-form-item>
                      </a-col>
                      <a-col :md="6" :sm="24" style="margin-bottom: 10px;">
                        <a-button type="primary" @click="$refs.chooseTable.refresh(true)" :disabled="chooseDisabled" id="storeTransferOutList-refresh">查询</a-button>
                        <a-button style="margin-left: 8px" @click="chooseResetSearchForm" :disabled="chooseDisabled" id="storeTransferOutList-reset">重置</a-button>
                      </a-col>
                    </a-row>
                  </a-form>
                </div>
              </a-col>
              <a-col :span="7" style="text-align: right;">
                <a-button size="small" id="allocateBillEdit-import-btn" @click="openGuideModal=true">导入产品</a-button>
                <a-button size="small" type="danger" style="margin-left: 5px" @click.stop="handleDel('', 'all')" id="chainTransferOutEdit-del-all-btn">整单删除</a-button>
              </a-col>
            </a-row>
            <!-- 列表 -->
            <s-table
              class="sTable"
              ref="chooseTable"
              size="small"
              index="1"
              tableId="table2"
              :rowKey="(record) => record.id"
              :columns="chooseColumns"
              :data="chooseLoadData"
              :scroll="{ y: 300 }"
              :defaultLoadData="false"
              bordered>
              <!-- 售价 -->
              <template slot="price" slot-scope="text, record, index">
                <!-- 调往对象为经销商时不可编辑售价，为员工或其他时可编辑售价 -->
                <div v-if="$route.params.dealerLevel == 'OTHER'">
                  <a-select
                    size="small"
                    id="allocateBillEdit-price"
                    option-label-prop="label"
                    v-model="record.price"
                    placeholder="请选择"
                    @change="e => priceChange(e, record)"
                    @focus="e => priceFocus(record, index)"
                    style="width: 100%;">
                    <a-select-option v-if="record.cost" :value="record.cost" :key="'cb-'+record.cost" :label="record.cost">成本 {{ record.cost }}</a-select-option>
                    <a-select-option v-if="loadDataSource&&loadDataSource[index]&&loadDataSource[index].provincePrice" :value="loadDataSource[index].provincePrice" :key="'A-'+loadDataSource[index].productSn" :label="loadDataSource[index].provincePrice">A价 {{ loadDataSource[index].provincePrice }}</a-select-option>
                    <a-select-option v-if="loadDataSource&&loadDataSource[index]&&loadDataSource[index].cityPrice" :value="loadDataSource[index].cityPrice" :key="'B-'+loadDataSource[index].productSn" :label="loadDataSource[index].cityPrice">B价 {{ loadDataSource[index].cityPrice }}</a-select-option>
                    <a-select-option v-if="loadDataSource&&loadDataSource[index]&&loadDataSource[index].specialPrice" :value="loadDataSource[index].specialPrice" :key="'C-'+loadDataSource[index].productSn" :label="loadDataSource[index].specialPrice">C价 {{ loadDataSource[index].specialPrice }}</a-select-option>
                  </a-select>
                </div>
                <span v-else>{{ record.price }}</span>
              </template>
              <!-- 调出数量 -->
              <template slot="qty" slot-scope="text, record">
                <a-input-number
                  size="small"
                  id="allocateBillEdit-qty"
                  v-model="record.qty"
                  :precision="0"
                  :min="1"
                  :max="999999"
                  placeholder="请输入"
                  @blur="e => qtyBlur(e.target.value, record)"
                  style="width: 100%;" />
              </template>
              <!-- 操作 -->
              <template slot="action" slot-scope="text, record">
                <a-button size="small" type="link" class="button-error" @click="handleDel(record)" id="allocateBillEdit-del-btn">删除</a-button>
              </template>
            </s-table>
          </a-collapse-panel>
        </a-collapse>
      </a-card>
    <!-- </a-spin> -->
    </div>
    <div class="affix-cont" v-if="basicInfoData">
      <a-button
        type="primary"
        id="allocateBillEdit-submit"
        size="large"
        :loading="spinning"
        class="button-primary"
        @click="handleOpen"
        style="padding: 0 60px;">提交</a-button>
    </div>
    <!-- 导入产品 -->
    <importGuideModal :openModal="openGuideModal" :params="{allocateSn: $route.params.sn}" @close="openGuideModal=false" @ok="handleGuideOk" />
    <!-- 打印导出 -->
    <print-modal :openModal="openModal" :itemData="basicInfoData" :nowType="nowType" @ok="handleOk" @close="openModal=false" />
    <!-- 提交调拨单 -->
    <dsModal ref="dsModal" :openModal="showDsModal" @close="showDsModal=false" @ok="handleSubmit" />
  </div>
</template>

<script>
import { commonMixin } from '@/utils/mixin'
import { STable, VSelect } from '@/components'
import ImportGuideModal from './importGuideModal.vue'
import printModal from './printModal.vue'
import dsModal from './dsModal.vue'
import { printFun, exportExcel } from '@/libs/JGPrint.js'
import { queryStockProductPage } from '@/api/stock'
import { productPriceInfo } from '@/api/product'
import AllocateType from '@/views/common/allocateType.js'
import { allocateBillSave, allocateBillDetailList, allocateBillDetailCount, allocateBillDetail, allocateBillDetailSave, allocateBillSubmit, allocateBillDetailDel, allocateBillDetailDelAll, allocateBillDetailPrint, allocateBillBatchInsert, allocateBillDetailExcel } from '@/api/allocateBill'

export default {
  name: 'TransferOutEdit',
  mixins: [commonMixin],
  components: { STable, VSelect, ImportGuideModal, AllocateType, printModal, dsModal },
  data () {
    return {
      spinning: false,
      showDsModal: false,
      queryParam: {
        productCode: '',
        productName: '',
        productOrigCode: ''
      },
      chooseQueryParam: {
        productCode: '',
        productName: ''
      },
      disabled: false, //  查询、重置按钮是否可操作
      loading: false,
      chooseDisabled: false, //  查询、重置按钮是否可操作
      advanced: false, // 高级搜索 展开/关闭
      productBrandList: [], //  产品品牌  下拉数据
      productTypeList: [], //  产品分类  下拉数据
      productType: [],
      warehouseList: [], //  仓库  下拉数据
      // 加载数据方法 必须为 Promise 对象
      loadData: parameter => {
        this.disabled = true
        const dealerLevel = this.$route.params.dealerLevel == 'OTHER' ? undefined : this.$route.params.dealerLevel
        return queryStockProductPage(Object.assign(parameter, this.queryParam, { zeroQtyFlag: '0', dealerLevel: dealerLevel })).then(res => {
          const data = res.data
          const no = (data.pageNo - 1) * data.pageSize
          for (var i = 0; i < data.list.length; i++) {
            data.list[i].no = no + i + 1
          }
          this.loadDataSource = data.list || []
          this.disabled = false
          return data
        })
      },
      loadDataSource: [],
      localDataSource: [],
      // 加载数据方法 必须为 Promise 对象
      chooseLoadData: parameter => {
        this.chooseDisabled = true
        const params = Object.assign(parameter, this.chooseQueryParam, { allocateSn: this.$route.params.sn })
        return allocateBillDetailList(params).then(res => {
          this.getDetailCount()
          const data = res.data
          const no = (data.pageNo - 1) * data.pageSize
          for (var i = 0; i < data.list.length; i++) {
            data.list[i].no = no + i + 1
            data.list[i].qtyBackups = data.list[i].qty
            data.list[i].priceBackups = data.list[i].price
          }
          this.localDataSource = data.list || []
          this.chooseDisabled = false
          return data
        })
      },
      productTotal: null, //  合计
      basicInfoData: null, // 基本信息
      openGuideModal: false, //  导入产品引导
      openModal: false,
      nowType: null
    }
  },
  computed: {
    columns () {
      const arr = [
        { title: '序号', dataIndex: 'no', width: '4%', align: 'center' },
        { title: '产品编码', dataIndex: 'productCode', width: '10%', align: 'center', customRender: function (text) { return text || '--' } },
        { title: '产品名称', dataIndex: 'productName', align: 'center', width: '29%', customRender: function (text) { return text || '--' }, ellipsis: true },
        { title: '原厂编码', dataIndex: 'productOrigCode', width: '10%', align: 'center', customRender: function (text) { return text || '--' } },
        // { title: '成本价', dataIndex: 'lastStockCost', width: '10%', align: 'center', customRender: function (text) { return ((text || text == 0) ? text : '--') } },
        // { title: '售价', dataIndex: 'productPrice', width: '10%', align: 'center', customRender: function (text) { return ((text || text == 0) ? text : '--') } },
        { title: '库存数量', dataIndex: 'currentStockQty', width: '10%', align: 'center', customRender: function (text) { return ((text || text == 0) ? text : '--') } },
        { title: '单位', dataIndex: 'productUnit', width: '7%', align: 'center', customRender: function (text) { return text || '--' } },
        { title: '操作', scopedSlots: { customRender: 'action1' }, width: '10%', align: 'center' }
      ]
      if (this.$hasPermissions('B_isShowCost')) { //  成本价权限
        arr.splice(4, 0, { title: '成本价', dataIndex: 'lastStockCost', width: '10%', align: 'center', customRender: function (text) { return ((text || text == 0) ? text : '--') } })
      }
      if (this.$hasPermissions('B_isShowPrice')) { //  售价权限
        const ind = this.$hasPermissions('B_isShowCost') ? 5 : 4
        arr.splice(ind, 0, { title: '售价', dataIndex: 'productPrice', width: '10%', align: 'center', customRender: function (text) { return ((text || text == 0) ? text : '--') } })
      }
      return arr
    },
    chooseColumns () {
      const arr = [
        { title: '序号', dataIndex: 'no', width: '4%', align: 'center' },
        { title: '产品编码', dataIndex: 'productEntity.code', width: '10%', align: 'center', customRender: function (text) { return text || '--' } },
        { title: '产品名称', dataIndex: 'productEntity.name', width: '20%', align: 'center', customRender: function (text) { return text || '--' }, ellipsis: true },
        { title: '原厂编码', dataIndex: 'productEntity.origCode', width: '10%', align: 'center', customRender: function (text) { return text || '--' } },
        // { title: '成本价', dataIndex: 'cost', width: '10%', align: 'center', customRender: function (text) { return ((text || text == 0) ? text : '--') } },
        // { title: '售价', scopedSlots: { customRender: 'price' }, width: '10%', align: 'center' },
        { title: '库存数量', dataIndex: 'currentStockQty', width: '10%', align: 'center', customRender: function (text) { return ((text || text == 0) ? text : '--') } },
        { title: '调出数量', scopedSlots: { customRender: 'qty' }, width: '10%', align: 'center' },
        { title: '单位', dataIndex: 'productEntity.unit', width: '6%', align: 'center', customRender: function (text) { return text || '--' } },
        { title: '操作', scopedSlots: { customRender: 'action' }, width: '6%', align: 'center' }
      ]
      if (this.$hasPermissions('B_isShowCost')) { //  成本价权限
        arr.splice(4, 0, { title: '成本价', dataIndex: 'cost', width: '10%', align: 'center', customRender: function (text) { return ((text || text == 0) ? text : '--') } })
      }
      if (this.$hasPermissions('B_isShowPrice')) { //  售价权限
        const ind = this.$hasPermissions('B_isShowCost') ? 5 : 4
        arr.splice(ind, 0, { title: '售价', scopedSlots: { customRender: 'price' }, width: '10%', align: 'center' })
      }
      return arr
    }
  },
  methods: {
    // 修改调拨类型
    changeAllocateType (val) {
      const _this = this
      this.$confirm({
        title: '提示',
        content: '确定要更改调拨类型吗？',
        centered: true,
        onOk () {
          const params = _this.basicInfoData
          allocateBillSave({
            allocateSn: params.allocateSn,
            targetType: params.targetType,
            targetSn: params.targetSn,
            targetName: params.targetName,
            allocateTypeSn: params.allocateTypeSn,
            remark: params.remark
          }).then(res => {
            if (res.status == 200) {
              _this.$message.success(res.message)
              _this.getDetail()
            } else {
              _this.spinning = false
            }
          })
        },
        onCancel () {
          _this.getDetail()
        }
      })
    },
    //  重置
    resetSearchForm () {
      this.queryParam.productCode = ''
      this.queryParam.productName = ''
      this.queryParam.productOrigCode = ''
      this.$refs.table.refresh(true)
    },
    // 双击快速添加
    handleClickRow (record) {
      return {
        on: {
          dblclick: (event) => {
            this.handleAdd(record)
          }
        }
      }
    },
    // 导入产品
    handleGuideOk (obj) {
      allocateBillBatchInsert(obj).then(res => {
        if (res.status == 200) {
          this.$refs.chooseTable.refresh(true)
        }
      })
    },
    // 已选产品  重置
    chooseResetSearchForm () {
      this.chooseQueryParam.productCode = ''
      this.chooseQueryParam.productName = ''
      this.$refs.chooseTable.refresh(true)
    },
    //  添加/编辑
    handleAdd (row, isEdit, isRefresh) {
      const params = {
        id: isEdit ? row.id : undefined,
        allocateSn: this.$route.params.sn,
        cost: isEdit ? row.cost : row.lastStockCost,
        price: isEdit ? row.price : row.productPrice,
        qty: isEdit ? row.qty : 1, //  添加时调出数量默认为1
        productSn: row.productSn
      }
      if (isEdit) { // 编辑
        // 清空数量时,值应保持未清空前的值，因数量不可为空
        if (!row.qty) {
          row.qty = row.qtyBackups
          return
        }
        if (!row.price) {
          row.price = row.priceBackups
          return
        }
      }
      this.spinning = true
      allocateBillDetailSave(params).then(res => {
        if (res.status == 200) {
          this.$message.success(res.message)
          if (isRefresh != 'noRefresh') {
            this.$refs.table.refresh()
          }
          this.$refs.chooseTable.refresh()
          this.spinning = false
        } else {
          this.spinning = false
        }
      })
    },
    //  删除
    handleDel (row, isAll) {
      const _this = this
      const content = isAll ? '删除后不可恢复，确定要进行整单删除吗？' : '删除后不可恢复，确定要进行删除吗？'
      this.$confirm({
        title: '提示',
        content: content,
        centered: true,
        onOk () {
          if (isAll) { //  整单删除
            allocateBillDetailDelAll({ sn: _this.$route.params.sn }).then(res => {
              if (res.status == 200) {
                _this.$message.success(res.message)
                _this.refashPage()
              }
            })
          } else { //  单个删除
            allocateBillDetailDel({ id: row.id }).then(res => {
              if (res.status == 200) {
                _this.$message.success(res.message)
                _this.refashPage()
              }
            })
          }
        }
      })
    },
    //  提交
    handleOpen () {
      if (this.localDataSource.length) {
        // 待提交
        if (this.basicInfoData.state == 'WAIT_SUBMIT') {
          this.showDsModal = true
        }
        // 待审核或审核不通过时
        if (this.basicInfoData.state == 'AUDIT_REJECT' || this.basicInfoData.state == 'WAIT_AUDIT') {
          this.handleSubmit()
        }
      } else {
        this.$message.warning('请选择产品')
      }
    },
    handleSubmit (params) {
      const _this = this
      const data = Object.assign({ allocateSn: this.$route.params.sn }, params || {})
      _this.spinning = true
      _this.showDsModal = false
      allocateBillSubmit(data).then(res => {
        if (res.status == 200) {
          _this.$message.success(res.message)
          _this.handleBack()
        } else {
          _this.spinning = false
        }
      })
    },
    // 基本信息
    getDetail () {
      this.spinning = true
      allocateBillDetail({ sn: this.$route.params.sn }).then(res => {
        if (res.status == 200) {
          this.basicInfoData = res.data
        } else {
          this.basicInfoData = null
        }
        this.spinning = false
      })
    },
    // 合计
    getDetailCount () {
      allocateBillDetailCount({ allocateSn: this.$route.params.sn }).then(res => {
        if (res.status == 200) {
          this.productTotal = res.data
        } else {
          this.productTotal = null
        }
      })
    },
    //  返回列表
    handleBack () {
      this.$router.push({ path: '/allocationManagement/transferOut/list', query: { closeLastOldTab: true } })
    },
    // 已选产品 调出数量  blur
    qtyBlur (val, record) {
      //  光标移出，值发生改变再调用编辑接口
      if (val != record.qtyBackups) {
        this.handleAdd(record, 'edit', 'noRefresh')
      }
    },
    // 已选产品 售价  change
    priceChange (val, record) {
      //  光标移出，值发生改变再调用编辑接口
      if (val != record.priceBackups) {
        this.handleAdd(record, 'edit', 'noRefresh')
      }
    },
    // 获取价格
    priceFocus (row, index) {
      if (row.productSn) {
        productPriceInfo({ sn: row.productSn }).then(res => {
          if (res.status == 200 && res.data) {
            this.loadDataSource[index].provincePrice = res.data.provincePrice || undefined
            this.loadDataSource[index].cityPrice = res.data.cityPrice || undefined
            this.loadDataSource[index].specialPrice = res.data.specialPrice || undefined
          }
        })
      }
    },
    // 导出
    handleExcel () {
      const _this = this
      this.spinning = true
      exportExcel(allocateBillDetailExcel, { allocateSn: this.outBizSn || this.$route.params.sn }, '调拨明细', function () {
        _this.spinning = false
      })
    },
    // 打印预览/快捷打印
    handlePrint (type) {
      this.nowType = type
      this.openModal = true
    },
    handleOk (objs) {
      const _this = this
      const params = JSON.parse(JSON.stringify(objs))
      delete params.type
      _this.spinning = true
      const taskName = this.nowType == 'dbPrint' ? '调拨' : '调拨分类'
      printFun(
        allocateBillDetailPrint,
        params,
        objs.isPreview ? 'preview' : 'print',
        taskName,
        (res) => {
          _this.$message.info(res.message)
          _this.spinning = false
        },
        {
          billType: 'ALLOCATE',
          billSn: objs.allocateSn,
          billNo: objs.allocateNo,
          printType: taskName + '打印'
        })
    },
    // 刷新当前页面
    refashPage () {
      this.$refs.table.refresh()
      this.$refs.chooseTable.refresh()
    },
    pageInit () {
      this.getDetail()
      this.resetSearchForm()
      this.chooseResetSearchForm()
    }
  },
  mounted () {
    if (!this.$store.state.app.isNewTab) { // 页签刷新时调用
      this.pageInit()
    }
  },
  activated () {
    // 如果是新页签打开或者进入新的子页（例：存在列表第2条数据编辑页页签时再打开第4条数据的编辑页），则重置当前页面
    if (this.$store.state.app.isNewTab || !this.$store.state.app.isNewSubTab) {
      this.pageInit()
    }
  },
  beforeRouteEnter (to, from, next) {
    next(vm => {})
  }
}
</script>

<style lang="less">
  .allocateBillEdit-wrap{
    position: relative;
    height: 100%;
    box-sizing: border-box;
    >.ant-spin-nested-loading{
      overflow-y: scroll;
      height: 100%;
      padding-bottom: 51px;
    }
    .allocateBillEdit-back{
      margin-bottom: 10px;
    }
    .allocateBillEdit-cont{
      margin-bottom: 10px;
      .sub-title{
        font-size: 12px;
        color: #808695;
        margin-left: 10px;
      }
      .tag-txt{
        font-size: 12px;
        color: #ed1c24;
      }
      .edit-circle-btn{
        margin-left: 15px;
        i{
          vertical-align: text-bottom;
        }
      }
      .import-btn{
        margin-left: 15px;
      }
    }
  }
</style>
